;-------------------------
;-- Tronex
;-- 2019/12/07
;-- Device power consumption
;-------------------------
;-- Device power is basically basic item condition [value range from 0 to 1]
;-- Device power get consumed constantly on use. Once power reach a critical point (power_critical in device section), it stops functioning properly
;-- The sections below controls how much each devices consumes on different types of usages
;-- [power_consumption] allows you to set up power consumption (per frame update) if device is in hand/slot/inventory
;-- [power_consumption_event] allows you to set up power consumption if device interacted with an event (for example: geiger counter beeping on rad anomalies)
;-- Power (condition) loss = current power consumption / amper_factor
;-- "current power consumption" means that devices might loss power to different reasons (for example: Enabling both light and NV for headlamps will sum both consumption into one)

[settings]
amper_factor						= 1000	-- mA

battery							   	= batteries_dead	;-- define battery section used by devices
geiger								= detector_geiger	;-- define geiger/dosimeter section for geiger keybind

condition_critical 					= 0.05          ;-- beyond this condition, device stop functioning (this is used if device section lacks power_critical)
condition_zero 						= 0.0001        ;-- device condition on unpacking batteries
condition_full 						= 0.9999		;-- fully charged device condition

;------------------------------------------------------------------------------
;-- List of PDAs found on NPCs that player can view
[npc_pda]
itm_pda_common
itm_pda_uncommon
itm_pda_rare

;------------------------------------------------------------------------------
;-- NOTES:
;-- 	value "p" allows related consumption type to be processed, aimed for Torch/NV in slot consumption (don't change, edit torch/NV consumption in [power_consumption_event])


[power_consumption];--	   		   = Active		,Slot		,Ruck
device_pda_actor                   = 0.01		,0.001		,0	
itm_pda_common                     = 0.01    	,0			,0	
itm_pda_uncommon                   = 0.01    	,0			,0	
itm_pda_rare                       = 0.01    	,0			,0	
detector_anomaly                   = 0.01    	,0			,0	
detector_radio                     = 0.01    	,0			,0	
detector_geiger                    = 0.01    	,0			,0	
detector_simple                    = 0.01    	,0			,0	
detector_advanced                  = 0.015    	,0			,0	
detector_elite                     = 0.02    	,0			,0	
detector_scientific                = 0.02    	,0			,0	
device_torch_dummy                 = 0		    ,p			,0	
device_torch_nv_1                  = 0		    ,p			,0	
device_torch_nv_2                  = 0		    ,p			,0	
device_torch_nv_3                  = 0		    ,p			,0	

;------------------------------------------------------------------------------
[power_consumption_event];--	   = 1/Torch    ,2/NV 
device_pda_actor                   = 0.01      	,0.002    
itm_pda_common                     = 0.01       ,0    
itm_pda_uncommon                   = 0.01       ,0    
itm_pda_rare                       = 0.01       ,0    
detector_anomaly                   = 0          ,0    
detector_radio                     = 0          ,0    
detector_geiger                    = 0.01       ,0.05    
detector_simple                    = 0          ,0    
detector_advanced                  = 0          ,0    
detector_elite                     = 0          ,0    
detector_scientific                = 0          ,0    
device_torch_dummy                 = 0.01       ,0    
device_torch_nv_1                  = 0.01       ,0.02 
device_torch_nv_2                  = 0.01       ,0.025
device_torch_nv_3                  = 0.01       ,0.03 
